---
title: Integrate with Termix
sidebar_label: Termix
support_level: community
---

## What is Termix

> Termix is a clientless web-based server management platform with SSH terminal, tunneling, and file editing capabilities.
>
> -- https://docs.termix.site/

## Preparation

The following placeholders are used in this guide:

- `termix.company` is the FQDN of the Termix installation.
- `authentik.company` is the FQDN of the authentik installation.

:::info
This documentation lists only the settings that you need to change from their default values. Be aware that any changes other than those explicitly mentioned in this guide could cause issues accessing your application.
:::

## authentik configuration

To support the integration of Termix with authentik, you need to create an application/provider pair in authentik.

1. Log in to authentik as an administrator and open the authentik Admin interface.
2. Navigate to **Applications** > **Applications** and click **Create with Provider** to create an application and provider pair. (Alternatively you can first create a provider separately, then create the application and connect it with the provider.)
    - **Application**: provide a descriptive name, an optional group for the type of application, the policy engine mode, and optional UI settings.
    - **Choose a Provider type**: select **OAuth2/OpenID Connect** as the provider type.
    - **Configure the Provider**: provide a name (or accept the auto-provided name), the authorization flow to use for this provider, and the following required configurations.
        - Note the **Client ID**, **Client Secret**, and **slug** values because they will be required later.
        - Set a `Strict` redirect URI to `https://termix.company/users/oidc/callback`.
        - Select any available signing key.
    - **Configure Bindings** _(optional)_: you can create a [binding](/docs/add-secure-apps/bindings-overview/) (policy, group, or user) to manage the listing and access to applications on a user's **My applications** page.

3. Click **Submit** to save the new application and provider.

## Termix configuration

1. Log in to Termix as an administrator.
2. Click your admin username in the bottom-left corner and open the **Admin Settings** interface.
3. Navigate to the **OIDC** tab.
4. Set the following required settings:
    - **Client ID**: Client ID from authentik
    - **Client Secret**: Client secret from authentik
    - **Authorization URL**: `https://authentik.company/application/o/authorize/`
    - **Issuer URL**: `https://authentik.company/application/o/<application_slug>/`
    - **Token URL**: `https://authentik.company/application/o/token/`
5. Click **Save Configuration**.

## Configuration verification

To verify that authentik is correctly integrated with Termix, first log out of your Termix account. From the login screen, select **External** and then choose **Login with External Provider**. You should be redirected to your authentik instance, and after successfully authenticating, the system will return you to Termix where you will be logged in automatically.

## Resources

- [Termix Docs - OIDC (OpenID Connect) Setup Guide](https://docs.termix.site/oidc)
