---
title: 'Troubleshooting: Issues compiling/linking'
---

# Troubleshooting: Issues compiling/linking

## Unresolved external symbol `__std_*`
If you encounter these errors when linking on Windows, make sure your Visual Studio 2022 installation is up to date; at least version **17.14** is required when using default pyke binaries.
